[LANGUAGE english; PARENT keywords; PAGE 11-97]
[C;6;B]		RELOC <value>
[J;1;N]
  Defines the number of reloc structures needed. The default is \
1000. Like SYMBOL, the number of reloc used by a link, may be \
known using VERBOSE keyword.

  See also:
[L;3][LINK hunk]		    HUNK
[LINK symbol]			    SYMBOL
[LINK verbose]			    VERBOSE
[5; LINK about; GOTO address]	    Become Registred
